NH Station Count

500 1000

1500

2000

2500

3000

1860 1880 1900 1920 1940 1960 1980 2000

NH % coverage

10 20 30 40 50

SH Station Count

100 200 300 400 500 600 700

SH % coverage

10 20 30

1860 1880 1900 1920 1940 1960 1980 2000